<?xml version="1.0"?>

<!--
 Fn+<F1>: suspend (this is not a labelled button, and entirely optional)
 Fn+<F3>: mute
 Fn+<F8>: volume down
 Fn+<F9>: volume up
-->

<definition>

  <config model="Fujitsu-Siemens Lifebook E8410">

    <VolUp        keycode="176" adj="2"/>
    <VolDown      keycode="174" adj="2"/>
    <Mute         keycode="160"/>

    <!-- Doesn't work: Unable to open APM device. -->
    <!-- <Sleep        keycode="223"/> -->
    <!-- <userdef keycode="223" command="/usr/local/bin/suspendscript.sh"/> -->
    <userdef keycode="223" command="/usr/local/bin/lockscript.sh"/>

  </config>

  <contributor>
    <name>Josef Spillner</name>
    <email>hacks@kuarepoti-dju.net</email>
  </contributor>

</definition>
